INSERT OR IGNORE INTO parks
    (park_id, park_name, lf_fence_distance, lf_fence_height, ct_fence_distance, ct_fence_height, rf_fence_distance, rf_fence_height, has_roof, latitude, longitude, elevation) VALUES
    ("ANA01", "Angel Stadium of Anaheim", 347, 5, 396, 6, 350, 8, 0, 33.800278, -117.882778, 148),
    ("ARL03", "Globe Life Field in Arlington", 332, 14, 400, 8, 325, 8, 1, 32.747361, -97.084167, 568),
    ("ATL03", "Truist Park", 335, 11, 400, 12, 330, 15, 0, 33.89, -84.468, 951),
    ("BAL12", "Oriole Park at Camden Yards", 333, 7, 400, 7, 318, 21, 0, 39.283889, -76.621667, 36),
    ("BIR01", "Rickwood Field", 325, 8, 400, 8, 332, 8, 0, 33.502222, -86.855833, 551),
    ("BOS07", "Fenway Park", 310, 37, 390, 15, 302, 3, 0, 42.34625, -71.09775, 16),
    ("CHI11", "Weeghman Park; Cubs Park", 355, 11, 400, 11, 353, 11, 0, 41.948056, -87.655556, 594),
    ("CHI12", "Guaranteed Rate Field", 330, 8, 400, 8, 335, 8, 0, 41.83, -87.633889, 594),
    ("CIN09", "Great American Ballpark", 328, 12, 404, 8, 325, 12, 0, 39.0975, -84.506667, 489),
    ("CLE08", "Progressive Field", 325, 19, 410, 9, 325, 9, 0, 41.495833, -81.685278, 653),
    ("DEN02", "Coors Field", 347, 8, 415, 8, 350, 17, 0, 39.756111, -104.994167, 5180),
    ("DET05", "Comerica Park", 345, 7, 420, 9, 330, 8, 0, 42.339169, -83.048607, 577),
    ("HOU03", "Minute Maid Park", 315, 21, 436, 10, 326, 7, 1, 29.756944, -95.355556, 20),
    ("KAN06", "Kauffman Stadium", 330, 9, 410, 9, 330, 9, 0, 39.051389, -94.480556, 856),
    ("LON01", "London Stadium", 330, 16, 392, 16, 330, 16, 1, 51.538611, -0.016389, 24),
    ("LOS02", "Wrigley Field", 355, 15, 400, 11.5, 353, 15, 0, 41.948056, -87.655556, 600),
    ("LOS03", "Dodger Stadium", 330, 8, 395, 8, 330, 8, 0, 34.073611, -118.24, 515),
    ("MEX02", "Estadio Alfredo Harp Helu", 332, 10, 410, 10, 332, 10, 0, 19.404, -99.0855, 7316),
    ("MIA02", "Marlins Park", 344, 9, 407, 12, 335, 9, 1, 25.778056, -80.219722, 7),
    ("MIL06", "Miller Park", 344, 8, 400, 8, 345, 8, 1, 43.028333, -87.971111, 617),
    ("MIN04", "Target Field", 339, 8, 404, 8, 328, 23, 0, 44.981667, -93.278333, 827),
    ("NYC20", "Citi Field", 335, 8, 408, 8, 330, 8, 0, 40.756944, -73.845833, 13),
    ("NYC21", "Yankee Stadium II", 318, 8, 408, 8, 314, 8, 0, 40.829167, -73.926389, 23),
    ("OAK01", "Oakland-Alameda County Coliseum", 330, 8, 400, 8, 330, 8, 0, 37.751667, -122.200556, -16),
    ("PHI13", "Citizens Bank Park", 329, 10, 401, 6, 330, 13, 0, 39.905833, -75.166389, 0),
    ("PHO01", "Chase Field", 330, 7.6, 407, 25, 335, 7.6, 1, 33.445526, -112.066664, 1060.36),
    ("PIT08", "PNC Park", 325, 6, 399, 15, 320, 21, 0, 40.446944, -80.005833, 725),
    ("SAN02", "Petco Park", 334, 4, 369, 4, 322, 5, 0, 32.7073, -117.1566, 16),
    ("SEA03", "T-Mobile Park", 331, 15, 401, 7, 326, 7, 1, 47.591, -122.333, 16),
    ("SEO01", "Gocheok Sky Dome", 325, 12, 400, 12, 325, 12, 1, 37.498222, 126.86725, 40),
    ("SFO03", "Oracle Park", 339, 8, 399, 8, 309, 25, 0, 37.778611, -122.389167, 13),
    ("STL10", "Busch Stadium III", 336, 8, 400, 8, 335, 8, 0, 38.6225, -90.193056, 440),
    ("STP01", "Tropicana Field", 315, 11, 404, 9, 322, 11, 1, 27.768333, -82.653333, 39),
    ("TOR02", "Rogers Centre", 328, 8, 400, 8, 328, 8, 1, 43.641389, -79.389167, 282),
    ("WAS11", "Nationals Park", 336, 8, 402, 12, 335, 10, 0, 38.872778, -77.0075, 7),
    ("WIL02", "BB&T Ballpark at Bowman Field", 323, 8, 411, 8, 331, 8, 0, 41.242347, -77.047067, 521)
